$
    The current symbol is the symbols that will be added to the  $
image. To select another symbols, select the CURRENT SYMBOL or   $
depressing F8. This will present a window of all the symbols.    $
The current symbol has an 'X' in the associated checkbox. To     $
select a new symbol to be used as the current symbol, move the   $
'X' to a new symbol.  OK will save this symbol as the current,   $
CANCEL will terminate this function.                             $
